////
   Copyright 2024 Thales DIS France SAS
   Licensed under the Solderpad Hardware License, Version 2.1 (the "License");
   you may not use this file except in compliance with the License.
   SPDX-License-Identifier: Apache-2.0 WITH SHL-2.1
   You may obtain a copy of the License at https://solderpad.org/licenses/

   Original Author: Jean-Roch COULON - Thales
////

[[_CVA6_mult_ports]]

.*mult module* IO ports
|===
|Signal | IO | Description | connexion | Type

|`clk_i` | in | Subsystem Clock | SUBSYSTEM | logic

|`rst_ni` | in | Asynchronous reset active low | SUBSYSTEM | logic

|`flush_i` | in | Flush | CONTROLLER | logic

|`fu_data_i` | in | FU data needed to execute instruction | ISSUE_STAGE | fu_data_t

|`mult_valid_i` | in | Mult instruction is valid | ISSUE_STAGE | logic

|`result_o` | out | Mult result | ISSUE_STAGE | logic[CVA6Cfg.XLEN-1:0]

|`mult_valid_o` | out | Mult result is valid | ISSUE_STAGE | logic

|`mult_ready_o` | out | Mutl is ready | ISSUE_STAGE | logic

|`mult_trans_id_o` | out | Mult transaction ID | ISSUE_STAGE | logic[CVA6Cfg.TRANS_ID_BITS-1:0]

|===

