[[cluster-nodes-hot-threads]]
=== Nodes hot_threads

Returns the hot threads on each selected node in the cluster.


[[cluster-nodes-hot-threads-api-request]]
==== {api-request-title}

`GET /_nodes/hot_threads` +

`GET /_nodes/<node_id>/hot_threads`


[[cluster-nodes-hot-threads-api-desc]]
==== {api-description-title}

This API yields a breakdown of the hot threads on each selected node in the
cluster. The output is plain text with a breakdown of each node's top hot 
threads.


[[cluster-nodes-hot-threads-api-path-params]]
==== {api-path-parms-title}

include::{docdir}/rest-api/common-parms.asciidoc[tag=node-id]


[[cluster-nodes-hot-threads-api-query-params]]
==== {api-query-parms-title}


`ignore_idle_threads`::
		(Optional, boolean) If true, known idle threads (e.g. waiting in a socket 
		select, or to get a task from an empty queue) are filtered out.  Defaults to 
		true.

`interval`::
		(Optional, <<time-units, time units>>) The interval to do the second 
		sampling of threads. Defaults to `500ms`.
		
`snapshots`::
		(Optional, integer) Number of samples of thread stacktrace. Defaults to 
		`10`.

`threads`::
		(Optional, integer) Specifies the number of hot threads to provide 
		information for. Defaults to `3`.

include::{docdir}/rest-api/common-parms.asciidoc[tag=timeoutparms]

`type`::
		(Optional, string) The type to sample. Available options are `block`, `cpu`, and 
		`wait`. Defaults to `cpu`.


[[cluster-nodes-hot-threads-api-example]]
==== {api-examples-title}

[source,console]
--------------------------------------------------
GET /_nodes/hot_threads
GET /_nodes/nodeId1,nodeId2/hot_threads
--------------------------------------------------
