{es} {version} requires Java 17 or later.  
There is not yet a FIPS-certified security module for Java 17 
that you can use when running {es} {version} in FIPS 140-2 mode.
If you run in FIPS 140-2 mode, you will either need to request
an exception from your security organization to upgrade to {es} {version}, 
or remain on {es} 7.x until Java 17 is certified. 
ifeval::["{release-state}"=="released"]
Alternatively, consider using {ess} in the
https://www.elastic.co/industries/public-sector/fedramp[FedRAMP-certified GovCloud region].
endif::[]