[[index-patterns-api-default-get]]
=== Get default index pattern API
++++
<titleabbrev>Get default index pattern</titleabbrev>
++++

experimental[] Retrieve a default index pattern ID. Kibana UI uses default index pattern unless user picks a different one.

[[index-patterns-api-default-get-request]]
==== Request

`GET <kibana host>:<port>/api/index_patterns/default`

`GET <kibana host>:<port>/s/<space_id>/api/index_patterns/default`

[[index-patterns-api-default-get-params]]
==== Path parameters

`space_id`::
(Optional, string) An identifier for the space. If `space_id` is not provided in the URL, the default space is used.

[[index-patterns-api-default-get-codes]]
==== Response code

`200`::
Indicates a successful call.

[[index-patterns-api-default-get-example]]
==== Example

Retrieve the default index pattern id:

[source,sh]
--------------------------------------------------
$ curl -X GET api/index_patterns/default
--------------------------------------------------
// KIBANA

The API returns an ID of a default index pattern:

[source,sh]
--------------------------------------------------
{
    "index_pattern_id": "..."
}
--------------------------------------------------

In case there is no default index pattern, the API returns:

[source,sh]
--------------------------------------------------
{
    "index_pattern_id": null
}
--------------------------------------------------
