The `Duration` field formatter can display the numeric value of a field in the following increments:

* Picoseconds
* Nanoseconds
* Microseconds
* Milliseconds
* Seconds
* Minutes
* Hours
* Days
* Weeks
* Months
* Years

You can specify these increments with up to 20 decimal places for both input and output formats.
