
Kibana is not started automatically after installation. How to start
and stop Kibana depends on whether your system uses SysV `init` or
`systemd` (used by newer distributions).  You can tell which is being used by
running this command:

[source,sh]
--------------------------------------------
ps -p 1
--------------------------------------------
