==== Run {kib} with `systemd`

To configure {kib} to start automatically when the system starts,
run the following commands:

[source,sh]
--------------------------------------------------
sudo /bin/systemctl daemon-reload
sudo /bin/systemctl enable kibana.service
--------------------------------------------------

{kib} can be started and stopped as follows:

[source,sh]
--------------------------------------------
sudo systemctl start kibana.service
sudo systemctl stop kibana.service
--------------------------------------------

These commands provide no feedback as to whether {kib} was started
successfully or not. Log information can be accessed via
`journalctl -u kibana.service`.